-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.81


######### Lightcurve features #########

amplitude  =  0.511267999948
cusum  =  0.199350627677
eta  =  0.430269086492
hl_amp_ratio  =  0.323087030487
kurtosis  =  -1.01544982274
n_points  =  221
period  =  0.602972065933
period_SNR  =  30.7645809684
period_log10FAP  =  -25.7552871239
period_uncertainty  =  0.000129356141379
phase_cusum  =  0.263403725733
phase_eta  =  0.295057191623
phi21  =  -2.52377997861
phi31  =  -4.28381084927
quartile31  =  0.79
r21  =  0.522602268529
r31  =  0.256135672328
shapiro_w  =  0.902159452438
skewness  =  -0.520080156599
slope_per10  =  -0.142000002476
slope_per90  =  0.277058388173
stetson_k  =  0.752055588072
weighted_mean  =  12.4898246127
weighted_std  =  0.479515788719
