-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.270488693517
cusum  =  0.195534792447
eta  =  0.660180208373
hl_amp_ratio  =  0.628330035009
kurtosis  =  -1.01361290724
n_points  =  271
period  =  0.709321892805
period_SNR  =  44.9640853542
period_log10FAP  =  -36.2945330625
period_uncertainty  =  0.000142720708324
phase_cusum  =  0.229068884975
phase_eta  =  0.299283123192
phi21  =  -2.1127089561
phi31  =  -3.58239103044
quartile31  =  0.36
r21  =  0.420613741126
r31  =  0.159346389377
shapiro_w  =  0.949012994766
skewness  =  -0.343475056653
slope_per10  =  -0.136810654554
slope_per90  =  0.213889069815
stetson_k  =  0.804899011353
weighted_mean  =  15.1953482703
weighted_std  =  0.227697415757
