-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.42


######### Lightcurve features #########

amplitude  =  0.159730226116
cusum  =  0.140746445901
eta  =  0.733820357708
hl_amp_ratio  =  0.834181552591
kurtosis  =  -0.810497146143
n_points  =  276
period  =  0.600749803814
period_SNR  =  43.6321230637
period_log10FAP  =  -37.4039427841
period_uncertainty  =  0.000103392162484
phase_cusum  =  0.24559860408
phase_eta  =  0.492432893286
phi21  =  1.20408950355
phi31  =  4.57110360526
quartile31  =  0.2
r21  =  0.264573822011
r31  =  0.134617919806
shapiro_w  =  0.976581394672
skewness  =  -0.233920536199
slope_per10  =  -0.134537531011
slope_per90  =  0.165935613482
stetson_k  =  0.833763454023
weighted_mean  =  15.3378020384
weighted_std  =  0.133026995091
