-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.351302320958
cusum  =  0.212399222916
eta  =  0.568947120065
hl_amp_ratio  =  0.570058512949
kurtosis  =  -0.406427894686
n_points  =  210
period  =  0.727777327797
period_SNR  =  21.5499035749
period_log10FAP  =  -17.0373413576
period_uncertainty  =  0.000177766822476
phase_cusum  =  0.241442101721
phase_eta  =  0.374960276072
phi21  =  0.752612492937
phi31  =  1.68978508327
quartile31  =  0.4075
r21  =  0.569034684574
r31  =  0.247069160214
shapiro_w  =  0.959067046642
skewness  =  -0.385774665117
slope_per10  =  -0.267641283546
slope_per90  =  0.252285276081
stetson_k  =  0.781395606797
weighted_mean  =  12.3208302326
weighted_std  =  0.276476684777
