-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.321044760233
cusum  =  0.141440406546
eta  =  0.481236308717
hl_amp_ratio  =  0.45322985992
kurtosis  =  -0.717263992293
n_points  =  317
period  =  0.623599164848
period_SNR  =  35.0711762889
period_log10FAP  =  -37.0849175998
period_uncertainty  =  0.000109773127623
phase_cusum  =  0.231991345576
phase_eta  =  0.467645343493
phi21  =  -1.989641476
phi31  =  -4.07491610294
quartile31  =  0.47
r21  =  0.45676069936
r31  =  0.300710184368
shapiro_w  =  0.91974157095
skewness  =  -0.658222545057
slope_per10  =  -0.0907365556429
slope_per90  =  0.236374746807
stetson_k  =  0.778150983806
weighted_mean  =  13.3165681098
weighted_std  =  0.311451868642
