-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.279117783349
cusum  =  0.149946102154
eta  =  0.632082555246
hl_amp_ratio  =  0.251963435538
kurtosis  =  -0.280351719876
n_points  =  253
period  =  0.570081607917
period_SNR  =  37.1763256004
period_log10FAP  =  -30.7602930405
period_uncertainty  =  0.000147508026054
phase_cusum  =  0.236662427128
phase_eta  =  0.365526705367
phi21  =  -2.44606060816
phi31  =  -4.46688957586
quartile31  =  0.36
r21  =  0.389012403114
r31  =  0.197522394765
shapiro_w  =  0.89769333601
skewness  =  -0.856998554616
slope_per10  =  -0.131933393172
slope_per90  =  0.324518201969
stetson_k  =  0.710643239538
weighted_mean  =  14.0627545899
weighted_std  =  0.246625999244
