-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.181542029228
cusum  =  0.146229954439
eta  =  0.837725451309
hl_amp_ratio  =  0.928124484112
kurtosis  =  -0.979903105239
n_points  =  243
period  =  0.685752552272
period_SNR  =  34.924667308
period_log10FAP  =  -29.4936582555
period_uncertainty  =  0.000161708675618
phase_cusum  =  0.254606200047
phase_eta  =  0.469792660053
phi21  =  -1.71755341188
phi31  =  -2.1257878165
quartile31  =  0.27
r21  =  0.338999442288
r31  =  0.135455043877
shapiro_w  =  0.963445663452
skewness  =  -0.236667754012
slope_per10  =  -0.155278264688
slope_per90  =  0.310438385188
stetson_k  =  0.839953894308
weighted_mean  =  15.2773018704
weighted_std  =  0.164273261995
