-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.341785137625
cusum  =  0.136627011911
eta  =  0.59723836984
hl_amp_ratio  =  0.255388964911
kurtosis  =  -0.129162042008
n_points  =  237
period  =  0.489803937407
period_SNR  =  30.1336118898
period_log10FAP  =  -21.8262332977
period_uncertainty  =  0.000102200658998
phase_cusum  =  0.243776989459
phase_eta  =  0.426516893316
phi21  =  3.84591778796
phi31  =  4.97916335892
quartile31  =  0.37
r21  =  0.370938749467
r31  =  0.312490664109
shapiro_w  =  0.888342618942
skewness  =  -0.941973999692
slope_per10  =  -0.0681406469256
slope_per90  =  0.146208799294
stetson_k  =  0.669996540687
weighted_mean  =  16.2594233328
weighted_std  =  0.273150268164
