-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.337295847975
cusum  =  0.192318381555
eta  =  0.566145541603
hl_amp_ratio  =  0.344734859081
kurtosis  =  -0.530761530984
n_points  =  210
period  =  0.650237695627
period_SNR  =  29.640363667
period_log10FAP  =  -23.9857829062
period_uncertainty  =  0.000185298169333
phase_cusum  =  0.265815405041
phase_eta  =  0.138327825652
phi21  =  0.773863303917
phi31  =  2.12133629714
quartile31  =  0.38
r21  =  0.528478868644
r31  =  0.323846131431
shapiro_w  =  0.917861878872
skewness  =  -0.705122137149
slope_per10  =  -0.220415493323
slope_per90  =  0.475470674394
stetson_k  =  0.725741461392
weighted_mean  =  14.2746803208
weighted_std  =  0.285996097719
