-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.8


######### Lightcurve features #########

amplitude  =  0.365235638902
cusum  =  0.147845957017
eta  =  0.529587198823
hl_amp_ratio  =  0.702357567463
kurtosis  =  -0.864432629709
n_points  =  208
period  =  0.702466289855
period_SNR  =  30.127653014
period_log10FAP  =  -23.8219881774
period_uncertainty  =  0.000308559439491
phase_cusum  =  0.269150012418
phase_eta  =  0.161334577939
phi21  =  1.11906214379
phi31  =  2.42380482543
quartile31  =  0.5525
r21  =  0.52888499991
r31  =  0.347845372432
shapiro_w  =  0.953129649162
skewness  =  -0.405648546012
slope_per10  =  -0.292978422099
slope_per90  =  0.394584354283
stetson_k  =  0.83976992441
weighted_mean  =  13.4108029491
weighted_std  =  0.321285139394
