-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.249456128177
cusum  =  0.153470834734
eta  =  0.633239831826
hl_amp_ratio  =  0.714799277595
kurtosis  =  -0.68055314998
n_points  =  255
period  =  0.572589333509
period_SNR  =  38.5413498969
period_log10FAP  =  -32.5616107234
period_uncertainty  =  0.000169661697631
phase_cusum  =  0.217094163071
phase_eta  =  0.377649967739
phi21  =  0.962329287703
phi31  =  -1.00653864351
quartile31  =  0.345
r21  =  0.421165491022
r31  =  0.164401863231
shapiro_w  =  0.971832633018
skewness  =  -0.366357289712
slope_per10  =  -0.157394652975
slope_per90  =  0.142196466306
stetson_k  =  0.822225028443
weighted_mean  =  15.9800399374
weighted_std  =  0.220698371339
