-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.206919730753
cusum  =  0.152654808568
eta  =  0.731432581736
hl_amp_ratio  =  1.2498128199
kurtosis  =  -1.1681853929
n_points  =  241
period  =  0.615603585075
period_SNR  =  39.6226937618
period_log10FAP  =  -33.8802410915
period_uncertainty  =  0.00013836898543
phase_cusum  =  0.262604003979
phase_eta  =  0.206061627824
phi21  =  -1.81576535474
phi31  =  -3.43958399143
quartile31  =  0.35
r21  =  0.398395256136
r31  =  0.201452478501
shapiro_w  =  0.937383234501
skewness  =  -0.083480253683
slope_per10  =  -0.306815199408
slope_per90  =  0.350500005297
stetson_k  =  0.887020839169
weighted_mean  =  12.7377424754
weighted_std  =  0.181302027692
