-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.324983631401
cusum  =  0.248026408917
eta  =  1.61541454241
hl_amp_ratio  =  0.708427735319
kurtosis  =  -0.517438059574
n_points  =  81
period  =  0.49371707979
period_SNR  =  11.6046470722
period_log10FAP  =  -2.01675508856
period_uncertainty  =  0.000108047887222
phase_cusum  =  0.299527621058
phase_eta  =  1.29968579092
phi21  =  1.44474025637
phi31  =  1.81521959103
quartile31  =  0.52
r21  =  0.319161397447
r31  =  0.422120639313
shapiro_w  =  0.988123118877
skewness  =  -0.127098874257
slope_per10  =  -0.0437499422523
slope_per90  =  0.0599473986965
stetson_k  =  0.701642674297
weighted_mean  =  19.0328353675
weighted_std  =  0.409878300132
