-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.217981616075
cusum  =  0.181216297906
eta  =  0.643698918064
hl_amp_ratio  =  0.547977029559
kurtosis  =  0.0394829764949
n_points  =  194
period  =  0.583032683783
period_SNR  =  24.7438886689
period_log10FAP  =  -17.5391940924
period_uncertainty  =  0.000149298690551
phase_cusum  =  0.248247057497
phase_eta  =  0.556927306892
phi21  =  1.27722158991
phi31  =  2.61705096864
quartile31  =  0.2675
r21  =  0.421583826205
r31  =  0.3545345228
shapiro_w  =  0.933337688446
skewness  =  -0.83627363585
slope_per10  =  -0.139833334833
slope_per90  =  0.216199997813
stetson_k  =  0.760006771193
weighted_mean  =  14.7846290136
weighted_std  =  0.215786430062
