-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.41


######### Lightcurve features #########

amplitude  =  2.06426669571
cusum  =  0.411841049725
eta  =  0.662422845518
hl_amp_ratio  =  0.221360365504
kurtosis  =  -0.590954351982
n_points  =  17
period  =  0.13021695921
period_SNR  =  4.47915366945
period_log10FAP  =  0.0
period_uncertainty  =  4.62681066565e-06
phase_cusum  =  0.411841049725
phase_eta  =  0.410992805121
phi21  =  -0.40193210578
phi31  =  0.338319045413
quartile31  =  0.92
r21  =  0.502869715477
r31  =  0.338063490174
shapiro_w  =  0.738731026649
skewness  =  -1.04042616558
slope_per10  =  -0.0142051782778
slope_per90  =  0.0678182005712
stetson_k  =  0.622486870632
weighted_mean  =  12.1017647059
weighted_std  =  1.73782905574
