-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.37


######### Lightcurve features #########

amplitude  =  0.365928674206
cusum  =  0.333551539238
eta  =  0.318220997695
hl_amp_ratio  =  0.795404914259
kurtosis  =  -0.0164378395904
n_points  =  239
period  =  0.999976779155
period_SNR  =  21.9774304906
period_log10FAP  =  -17.4636600649
period_uncertainty  =  0.000276634074531
phase_cusum  =  0.227313577046
phase_eta  =  0.823233581074
phi21  =  2.01462118678
phi31  =  1.64452994308
quartile31  =  0.365
r21  =  0.364265164049
r31  =  0.158115106932
shapiro_w  =  0.948292732239
skewness  =  -0.688297883428
slope_per10  =  -0.0977044353928
slope_per90  =  0.130134894716
stetson_k  =  0.790185489811
weighted_mean  =  11.8297149941
weighted_std  =  0.282977409339
