-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.68


######### Lightcurve features #########

amplitude  =  0.199246157835
cusum  =  0.14393868971
eta  =  0.686770642527
hl_amp_ratio  =  0.950500116096
kurtosis  =  -1.3506616083
n_points  =  239
period  =  0.849443862985
period_SNR  =  40.4985730745
period_log10FAP  =  -36.9565964829
period_uncertainty  =  0.000405871539541
phase_cusum  =  0.262148039284
phase_eta  =  0.0803038227889
phi21  =  1.41753486703
phi31  =  3.10098682791
quartile31  =  0.32
r21  =  0.425236359578
r31  =  0.176150442831
shapiro_w  =  0.934900462627
skewness  =  0.0257362790911
slope_per10  =  -0.454885332053
slope_per90  =  0.509239180258
stetson_k  =  0.875472014774
weighted_mean  =  14.0297247182
weighted_std  =  0.171448732559
