-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.73


######### Lightcurve features #########

amplitude  =  0.428920039711
cusum  =  0.225128575089
eta  =  0.493683507381
hl_amp_ratio  =  0.459555411171
kurtosis  =  -1.46467631536
n_points  =  196
period  =  0.6436937543
period_SNR  =  32.2199922486
period_log10FAP  =  -27.5895731063
period_uncertainty  =  0.000184499903479
phase_cusum  =  0.285294612618
phase_eta  =  0.0793517308828
phi21  =  -2.25482423701
phi31  =  -1.02791825941
quartile31  =  0.77
r21  =  0.574366528926
r31  =  0.372280805917
shapiro_w  =  0.898886561394
skewness  =  -0.232043932204
slope_per10  =  -0.115637730346
slope_per90  =  0.316685505361
stetson_k  =  0.851374638642
weighted_mean  =  12.0165236819
weighted_std  =  0.426008740447
