-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.263806979603
cusum  =  0.184774156949
eta  =  0.546402277074
hl_amp_ratio  =  0.35757740605
kurtosis  =  -0.712783941002
n_points  =  211
period  =  0.589784165639
period_SNR  =  27.362037059
period_log10FAP  =  -20.7883332443
period_uncertainty  =  0.000149713135337
phase_cusum  =  0.294908019382
phase_eta  =  0.365400188609
phi21  =  0.630108402057
phi31  =  1.98601522457
quartile31  =  0.33
r21  =  0.495897593275
r31  =  0.271905269124
shapiro_w  =  0.923898518085
skewness  =  -0.634660275542
slope_per10  =  -0.275504258174
slope_per90  =  0.198212968932
stetson_k  =  0.699866246588
weighted_mean  =  16.3835114037
weighted_std  =  0.231439480869
