-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.71


######### Lightcurve features #########

amplitude  =  0.341724673172
cusum  =  0.318674680494
eta  =  0.434521571894
hl_amp_ratio  =  0.421437351675
kurtosis  =  0.799443475217
n_points  =  87
period  =  0.644847868774
period_SNR  =  10.5633988912
period_log10FAP  =  -6.95975002344
period_uncertainty  =  0.000102945064688
phase_cusum  =  0.229176035184
phase_eta  =  0.288347100171
phi21  =  0.713287800743
phi31  =  4.40701251574
quartile31  =  0.27
r21  =  0.427818759137
r31  =  0.32412924021
shapiro_w  =  0.802802860737
skewness  =  -1.35400632455
slope_per10  =  -0.56279999204
slope_per90  =  0.897800009698
stetson_k  =  0.694062429567
weighted_mean  =  13.5597916088
weighted_std  =  0.25512014054
