-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.306840886101
cusum  =  0.145198553191
eta  =  0.548770401214
hl_amp_ratio  =  0.400904912389
kurtosis  =  -0.448093800174
n_points  =  294
period  =  0.631575480397
period_SNR  =  29.6895169067
period_log10FAP  =  -29.9784268676
period_uncertainty  =  0.000111145906514
phase_cusum  =  0.226350995547
phase_eta  =  0.318848113583
phi21  =  -2.32923856475
phi31  =  -1.17607516595
quartile31  =  0.38
r21  =  0.510087023158
r31  =  0.285862634234
shapiro_w  =  0.913720965385
skewness  =  -0.766995510568
slope_per10  =  -0.166749315472
slope_per90  =  0.332747987132
stetson_k  =  0.735706773086
weighted_mean  =  14.1838027049
weighted_std  =  0.269585393885
