-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.391353304903
cusum  =  0.233766207449
eta  =  0.462979872486
hl_amp_ratio  =  0.388918846079
kurtosis  =  -0.42171809868
n_points  =  191
period  =  0.564653355126
period_SNR  =  27.0738570822
period_log10FAP  =  -21.7121919941
period_uncertainty  =  0.000101425020228
phase_cusum  =  0.26327905291
phase_eta  =  0.259253272187
phi21  =  3.96270347955
phi31  =  5.34347347069
quartile31  =  0.47
r21  =  0.464646740568
r31  =  0.302039729102
shapiro_w  =  0.904459357262
skewness  =  -0.809151803425
slope_per10  =  -0.140632128687
slope_per90  =  0.276602859739
stetson_k  =  0.729642263087
weighted_mean  =  13.7691239124
weighted_std  =  0.336231181909
