<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.297178862718
cusum  =  0.153616070146
eta  =  0.495441641715
hl_amp_ratio  =  1.07973421884
kurtosis  =  -1.02364488927
n_points  =  358
period  =  0.707264107256
period_SNR  =  45.657325674
period_log10FAP  =  -49.8763191841
period_uncertainty  =  0.00014069868189
phase_cusum  =  0.208938604336
phase_eta  =  0.0556123446577
phi21  =  1.17869431142
phi31  =  -0.475068083006
quartile31  =  0.37
r21  =  0.481731931698
r31  =  0.291461407818
shapiro_w  =  0.964220702648
skewness  =  -0.158711308978
slope_per10  =  -0.199824822212
slope_per90  =  0.415136789498
stetson_k  =  0.850206836896
weighted_mean  =  14.0608485846
weighted_std  =  0.231391244242
</pre></body></html>