-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.20011662573
cusum  =  0.180610449152
eta  =  0.765772345371
hl_amp_ratio  =  0.474881315849
kurtosis  =  -0.615652023691
n_points  =  173
period  =  0.527720572989
period_SNR  =  26.6761227798
period_log10FAP  =  -16.4993683655
period_uncertainty  =  0.000112090185308
phase_cusum  =  0.252687995703
phase_eta  =  0.603771238681
phi21  =  3.57837973541
phi31  =  4.18798318517
quartile31  =  0.28
r21  =  0.405606686865
r31  =  0.193779969547
shapiro_w  =  0.933238208294
skewness  =  -0.639747013134
slope_per10  =  -0.17548972591
slope_per90  =  0.237342103431
stetson_k  =  0.778077563477
weighted_mean  =  13.809150325
weighted_std  =  0.179120604093
