-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.326930259689
cusum  =  0.18178069573
eta  =  1.01456866898
hl_amp_ratio  =  0.196413587444
kurtosis  =  1.62878611367
n_points  =  204
period  =  0.548220166827
period_SNR  =  29.3245580797
period_log10FAP  =  -17.471501002
period_uncertainty  =  0.000112910927519
phase_cusum  =  0.242144426874
phase_eta  =  0.172459390496
phi21  =  0.663694645308
phi31  =  1.43553555624
quartile31  =  0.2725
r21  =  0.530897231131
r31  =  0.428682541683
shapiro_w  =  0.787641346455
skewness  =  -1.56339280156
slope_per10  =  -0.21544731155
slope_per90  =  0.297218035735
stetson_k  =  0.59077186435
weighted_mean  =  13.240423313
weighted_std  =  0.262088544635
