-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.361417023303
cusum  =  0.177682149126
eta  =  0.596859769986
hl_amp_ratio  =  0.6245104918
kurtosis  =  -0.7750899618
n_points  =  194
period  =  0.662131486099
period_SNR  =  30.0680946405
period_log10FAP  =  -25.6591396851
period_uncertainty  =  0.000223090147095
phase_cusum  =  0.283390333986
phase_eta  =  0.29456015805
phi21  =  -2.17161859373
phi31  =  -4.00346540982
quartile31  =  0.48
r21  =  0.371930871043
r31  =  0.228093537927
shapiro_w  =  0.94138532877
skewness  =  -0.505361796802
slope_per10  =  -0.125109109406
slope_per90  =  0.286599990601
stetson_k  =  0.830975331642
weighted_mean  =  12.5082319925
weighted_std  =  0.284498078476
