-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.18033912451
cusum  =  0.109397386764
eta  =  0.602919947824
hl_amp_ratio  =  0.825698133975
kurtosis  =  -1.15366799555
n_points  =  434
period  =  0.62553658083
period_SNR  =  53.9061524229
period_log10FAP  =  -57.8425343478
period_uncertainty  =  0.000106528712236
phase_cusum  =  0.2621111123
phase_eta  =  0.253677385198
phi21  =  0.923269011555
phi31  =  2.37167023664
quartile31  =  0.2575
r21  =  0.406002174189
r31  =  0.197663547284
shapiro_w  =  0.952505588531
skewness  =  -0.215166660237
slope_per10  =  -0.156437140118
slope_per90  =  0.183474867164
stetson_k  =  0.870775504751
weighted_mean  =  13.7246326897
weighted_std  =  0.143010652128
