<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.233398721263
cusum  =  0.109094144913
eta  =  0.775821392412
hl_amp_ratio  =  0.378227053245
kurtosis  =  0.0601894370057
n_points  =  263
period  =  0.589006385613
period_SNR  =  31.3365644313
period_log10FAP  =  -29.434605396
period_uncertainty  =  9.64761843645e-05
phase_cusum  =  0.217959445112
phase_eta  =  0.421304037235
phi21  =  0.669584643811
phi31  =  2.02394955984
quartile31  =  0.27
r21  =  0.453851052042
r31  =  0.227465999677
shapiro_w  =  0.927984595299
skewness  =  -0.733305621017
slope_per10  =  -0.212051058621
slope_per90  =  0.255624115257
stetson_k  =  0.744456353736
weighted_mean  =  14.1061843575
weighted_std  =  0.192141279825
</pre></body></html>