-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.84


######### Lightcurve features #########

amplitude  =  0.152635353994
cusum  =  0.177957053328
eta  =  0.640250544911
hl_amp_ratio  =  0.483711010022
kurtosis  =  7.79070122279
n_points  =  221
period  =  0.650883259902
period_SNR  =  11.8568077614
period_log10FAP  =  -6.63750011811
period_uncertainty  =  0.000120703820449
phase_cusum  =  0.145960732433
phase_eta  =  1.17658116412
phi21  =  -0.00844933794696
phi31  =  1.58041439379
quartile31  =  0.16
r21  =  0.374841507522
r31  =  0.117941908799
shapiro_w  =  0.837581574917
skewness  =  -1.89686966035
slope_per10  =  -0.134223403884
slope_per90  =  0.180249998812
stetson_k  =  0.62949002044
weighted_mean  =  11.0528054299
weighted_std  =  0.186698642086
