-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.34


######### Lightcurve features #########

amplitude  =  0.356943817356
cusum  =  0.137686092742
eta  =  0.558257057638
hl_amp_ratio  =  1.02884784626
kurtosis  =  -1.21613847614
n_points  =  389
period  =  0.929137024595
period_SNR  =  52.2255309225
period_log10FAP  =  -60.5219671512
period_uncertainty  =  0.000232214605697
phase_cusum  =  0.238791633771
phase_eta  =  0.10193635202
phi21  =  1.71473345689
phi31  =  -0.0103880588564
quartile31  =  0.55
r21  =  0.411868976865
r31  =  0.165007292829
shapiro_w  =  0.952729165554
skewness  =  0.0138640470275
slope_per10  =  -0.257499981672
slope_per90  =  0.31799999997
stetson_k  =  0.881891003437
weighted_mean  =  12.6012300388
weighted_std  =  0.308480057358
