-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.307924636178
cusum  =  0.128244394924
eta  =  0.62777582471
hl_amp_ratio  =  0.467170874859
kurtosis  =  -0.967067275116
n_points  =  264
period  =  0.611789002568
period_SNR  =  37.9933987506
period_log10FAP  =  -33.7741625272
period_uncertainty  =  0.000127394120031
phase_cusum  =  0.262594969855
phase_eta  =  0.0885230784259
phi21  =  0.857307858612
phi31  =  -1.07857763658
quartile31  =  0.4225
r21  =  0.498819006203
r31  =  0.317832570091
shapiro_w  =  0.925203442574
skewness  =  -0.50486035432
slope_per10  =  -0.190375695996
slope_per90  =  0.229925573795
stetson_k  =  0.80623253649
weighted_mean  =  14.2206579815
weighted_std  =  0.273129605125
