-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.305375322424
cusum  =  0.170572232237
eta  =  0.45033938311
hl_amp_ratio  =  0.840411230458
kurtosis  =  -0.610006306472
n_points  =  208
period  =  0.649665838959
period_SNR  =  27.785708884
period_log10FAP  =  -24.6030860173
period_uncertainty  =  0.00018273974223
phase_cusum  =  0.236732533118
phase_eta  =  0.133455299238
phi21  =  1.07539491969
phi31  =  -0.76112111023
quartile31  =  0.35
r21  =  0.457316178039
r31  =  0.328343012762
shapiro_w  =  0.958217322826
skewness  =  -0.451466312278
slope_per10  =  -0.172365556736
slope_per90  =  0.367868857066
stetson_k  =  0.818594189658
weighted_mean  =  14.261820169
weighted_std  =  0.241876940611
