<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  EB_EC
class_probability =  0.66


######### Lightcurve features #########

amplitude  =  0.401512006349
cusum  =  0.103437233938
eta  =  0.772419427538
hl_amp_ratio  =  2.33463653389
kurtosis  =  -0.90001248413
n_points  =  231
period  =  0.18217590295
period_SNR  =  41.1229911988
period_log10FAP  =  -32.4762030816
period_uncertainty  =  1.41212248151e-05
phase_cusum  =  0.310758272186
phase_eta  =  0.380911914937
phi21  =  3.00864157491
phi31  =  3.58958945543
quartile31  =  0.59
r21  =  0.262630640067
r31  =  0.174058730779
shapiro_w  =  0.911448538303
skewness  =  0.605183780043
slope_per10  =  -0.0374291558327
slope_per90  =  0.0300810084347
stetson_k  =  0.79562871993
weighted_mean  =  11.0291944848
weighted_std  =  0.348572046512
</pre></body></html>