-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.24899947514
cusum  =  0.13250745775
eta  =  0.59560875816
hl_amp_ratio  =  0.761701398067
kurtosis  =  -1.02932321831
n_points  =  238
period  =  0.600318395572
period_SNR  =  31.3697268585
period_log10FAP  =  -24.5307018306
period_uncertainty  =  0.000126179168099
phase_cusum  =  0.238898735397
phase_eta  =  0.698780761542
phi21  =  0.89470482759
phi31  =  4.62498729421
quartile31  =  0.3975
r21  =  0.318204481003
r31  =  0.189082716154
shapiro_w  =  0.942675828934
skewness  =  -0.36720826309
slope_per10  =  -0.141249716719
slope_per90  =  0.210334355253
stetson_k  =  0.860632535494
weighted_mean  =  13.5064097363
weighted_std  =  0.241848435323
