-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.297736643024
cusum  =  0.141741158163
eta  =  0.570344011933
hl_amp_ratio  =  0.569426768112
kurtosis  =  -0.922294156776
n_points  =  289
period  =  0.697811965635
period_SNR  =  28.8494121454
period_log10FAP  =  -29.2812458644
period_uncertainty  =  0.000138763122838
phase_cusum  =  0.240033739181
phase_eta  =  0.443219280292
phi21  =  1.31815899739
phi31  =  -0.314634951579
quartile31  =  0.39
r21  =  0.569331510215
r31  =  0.277699053749
shapiro_w  =  0.948124289513
skewness  =  -0.344256030797
slope_per10  =  -0.156033330131
slope_per90  =  0.230933337783
stetson_k  =  0.80789380656
weighted_mean  =  12.1550519031
weighted_std  =  0.274807414298
