-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.161385818392
cusum  =  0.102362705782
eta  =  0.623509094685
hl_amp_ratio  =  1.04750119023
kurtosis  =  -0.611721396513
n_points  =  302
period  =  0.736992421355
period_SNR  =  37.3322261696
period_log10FAP  =  -38.3693537942
period_uncertainty  =  0.000151320723387
phase_cusum  =  0.286483929091
phase_eta  =  0.25501691973
phi21  =  1.206477481
phi31  =  -0.424221139035
quartile31  =  0.22
r21  =  0.44088908051
r31  =  0.289402025426
shapiro_w  =  0.971806883812
skewness  =  -0.247478158735
slope_per10  =  -0.25431085074
slope_per90  =  0.28828114176
stetson_k  =  0.860676687612
weighted_mean  =  13.1952433331
weighted_std  =  0.142563540642
