-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.307592612231
cusum  =  0.167053875308
eta  =  0.59083437883
hl_amp_ratio  =  0.373938575206
kurtosis  =  -0.194435824748
n_points  =  263
period  =  0.567403383546
period_SNR  =  39.086382219
period_log10FAP  =  -33.8732698746
period_uncertainty  =  0.000146087388984
phase_cusum  =  0.305473151101
phase_eta  =  0.0995373068011
phi21  =  -2.55525069706
phi31  =  -1.57112379361
quartile31  =  0.345
r21  =  0.460208730262
r31  =  0.373483994075
shapiro_w  =  0.88432264328
skewness  =  -0.936505282485
slope_per10  =  -0.155431762149
slope_per90  =  0.242146473408
stetson_k  =  0.720718818084
weighted_mean  =  15.0336122732
weighted_std  =  0.262668625454
