-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.87


######### Lightcurve features #########

amplitude  =  0.697338885388
cusum  =  0.357698388326
eta  =  0.236425647454
hl_amp_ratio  =  0.823693418165
kurtosis  =  -0.837740349328
n_points  =  153
period  =  0.581492551301
period_SNR  =  17.2716506489
period_log10FAP  =  -13.4031504496
period_uncertainty  =  0.000102505388635
phase_cusum  =  0.312110040331
phase_eta  =  0.547842887961
phi21  =  0.362994213803
phi31  =  3.06243923123
quartile31  =  0.84
r21  =  0.482691877433
r31  =  0.199101442433
shapiro_w  =  0.935856878757
skewness  =  -0.122205337696
slope_per10  =  -0.0862742519488
slope_per90  =  0.296604768673
stetson_k  =  0.774440182311
weighted_mean  =  9.87384950927
weighted_std  =  0.700590428074
