-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.46


######### Lightcurve features #########

amplitude  =  0.286047822701
cusum  =  0.0903281235073
eta  =  0.543077570189
hl_amp_ratio  =  0.72740503046
kurtosis  =  -0.823687173626
n_points  =  323
period  =  0.88795518392
period_SNR  =  38.8380948158
period_log10FAP  =  -40.7219807447
period_uncertainty  =  0.000223081910795
phase_cusum  =  0.249100906964
phase_eta  =  0.148611874074
phi21  =  -2.16509635441
phi31  =  -1.13966413517
quartile31  =  0.38
r21  =  0.433774911577
r31  =  0.350625289335
shapiro_w  =  0.948221623898
skewness  =  -0.416230897386
slope_per10  =  -0.207058756855
slope_per90  =  0.468199979514
stetson_k  =  0.821864414016
weighted_mean  =  14.3596501839
weighted_std  =  0.246650119376
