-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.276389332055
cusum  =  0.147317629987
eta  =  0.533590277955
hl_amp_ratio  =  0.282376388558
kurtosis  =  -0.501997924164
n_points  =  143
period  =  0.61893395056
period_SNR  =  13.3028633222
period_log10FAP  =  -12.6685337049
period_uncertainty  =  0.000120274771278
phase_cusum  =  0.248805186318
phase_eta  =  0.186867797892
phi21  =  1.04580946972
phi31  =  2.07961097674
quartile31  =  0.38
r21  =  0.549497277125
r31  =  0.427601161994
shapiro_w  =  0.860276520252
skewness  =  -0.900391013358
slope_per10  =  -0.209402394235
slope_per90  =  0.456799967214
stetson_k  =  0.722747551384
weighted_mean  =  13.3109624413
weighted_std  =  0.26333543738
