-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.332223001886
cusum  =  0.165158975127
eta  =  0.915083362925
hl_amp_ratio  =  0.357454745819
kurtosis  =  -0.55617857376
n_points  =  127
period  =  0.530860796615
period_SNR  =  23.7181146357
period_log10FAP  =  -14.9267355077
period_uncertainty  =  0.000116460629043
phase_cusum  =  0.220527824743
phase_eta  =  0.202723175887
phi21  =  0.828502279227
phi31  =  4.99305755915
quartile31  =  0.35
r21  =  0.425718194035
r31  =  0.232729934381
shapiro_w  =  0.880505025387
skewness  =  -0.819852123305
slope_per10  =  -0.161552133385
slope_per90  =  0.458745241531
stetson_k  =  0.751387577396
weighted_mean  =  13.6731457218
weighted_std  =  0.262165664975
