-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.289950644727
cusum  =  0.162339181536
eta  =  0.586769055317
hl_amp_ratio  =  0.333629076312
kurtosis  =  -0.892346663847
n_points  =  217
period  =  0.646344623101
period_SNR  =  28.2650069883
period_log10FAP  =  -28.3710051542
period_uncertainty  =  0.000119172624124
phase_cusum  =  0.297124075786
phase_eta  =  0.115213684582
phi21  =  0.908257330171
phi31  =  -0.671405397248
quartile31  =  0.39
r21  =  0.437153358954
r31  =  0.294889819205
shapiro_w  =  0.911389410496
skewness  =  -0.589160940183
slope_per10  =  -0.297010109615
slope_per90  =  0.482799969614
stetson_k  =  0.754844809185
weighted_mean  =  13.7863510105
weighted_std  =  0.237978775255
