-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.170884008131
cusum  =  0.0866991725276
eta  =  0.657856444694
hl_amp_ratio  =  0.658585817876
kurtosis  =  -0.987009470211
n_points  =  262
period  =  0.710732848665
period_SNR  =  32.5850655843
period_log10FAP  =  -33.1426598443
period_uncertainty  =  0.000110999979072
phase_cusum  =  0.215733979911
phase_eta  =  0.110949530265
phi21  =  -1.81421274796
phi31  =  -3.60331018511
quartile31  =  0.2175
r21  =  0.455071509683
r31  =  0.278474804347
shapiro_w  =  0.941005289555
skewness  =  -0.40146775476
slope_per10  =  -0.352982048469
slope_per90  =  0.509570021097
stetson_k  =  0.83879501379
weighted_mean  =  13.5888351107
weighted_std  =  0.136088338206
