-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  EB_ED
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.149645166214
cusum  =  0.129733247791
eta  =  1.16744346038
hl_amp_ratio  =  6.64925461306
kurtosis  =  12.2012898215
n_points  =  333
period  =  0.634643419355
period_SNR  =  18.0786811983
period_log10FAP  =  -11.6701693654
period_uncertainty  =  0.00011372723083
phase_cusum  =  0.258355784965
phase_eta  =  0.555596752332
phi21  =  -0.0325678196094
phi31  =  2.99275515852
quartile31  =  0.05
r21  =  0.593206520103
r31  =  0.281675056081
shapiro_w  =  0.54241502285
skewness  =  3.40877006857
slope_per10  =  -0.161510629453
slope_per90  =  0.207961084288
stetson_k  =  0.455820905381
weighted_mean  =  15.6384302432
weighted_std  =  0.151211145431
