-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.19814855734
cusum  =  0.15251889818
eta  =  0.455342710065
hl_amp_ratio  =  0.47424068031
kurtosis  =  -0.170470340653
n_points  =  498
period  =  0.598194042797
period_SNR  =  54.0010506898
period_log10FAP  =  -53.4286086424
period_uncertainty  =  0.000100638300648
phase_cusum  =  0.22081396438
phase_eta  =  0.737111116016
phi21  =  0.76257431821
phi31  =  -0.593406071799
quartile31  =  0.26
r21  =  0.369719868359
r31  =  0.129316775999
shapiro_w  =  0.938697040081
skewness  =  -0.759977839598
slope_per10  =  -0.0669047509328
slope_per90  =  0.0792229718942
stetson_k  =  0.741314130203
weighted_mean  =  14.3952425919
weighted_std  =  0.18182829382
