-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.315620021224
cusum  =  0.125824502993
eta  =  0.646657000548
hl_amp_ratio  =  0.568782608518
kurtosis  =  -0.645559737134
n_points  =  265
period  =  0.721421224994
period_SNR  =  39.4939088785
period_log10FAP  =  -33.918949687
period_uncertainty  =  0.000148489472734
phase_cusum  =  0.221839911237
phase_eta  =  0.375494258024
phi21  =  -2.10375410706
phi31  =  -0.865853426224
quartile31  =  0.42
r21  =  0.404546443293
r31  =  0.322593853214
shapiro_w  =  0.947045981884
skewness  =  -0.441517854863
slope_per10  =  -0.104423327177
slope_per90  =  0.426431278859
stetson_k  =  0.828044593769
weighted_mean  =  13.142084863
weighted_std  =  0.272174814776
