-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.325250773368
cusum  =  0.102473185824
eta  =  0.567694532682
hl_amp_ratio  =  0.264290451078
kurtosis  =  -0.757648732862
n_points  =  376
period  =  0.604941775415
period_SNR  =  47.9238845027
period_log10FAP  =  -49.1131401347
period_uncertainty  =  0.000100495347106
phase_cusum  =  0.259951141307
phase_eta  =  0.135122676597
phi21  =  0.689004122321
phi31  =  -1.39828706783
quartile31  =  0.4425
r21  =  0.464737948736
r31  =  0.3004985424
shapiro_w  =  0.880135834217
skewness  =  -0.763805489051
slope_per10  =  -0.0952208013176
slope_per90  =  0.201836005133
stetson_k  =  0.711154286327
weighted_mean  =  13.9449480898
weighted_std  =  0.279703579973
