-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.6


######### Lightcurve features #########

amplitude  =  0.310982662863
cusum  =  0.197600031892
eta  =  0.683285392325
hl_amp_ratio  =  0.816732931305
kurtosis  =  -0.54511913691
n_points  =  53
period  =  0.111378673025
period_SNR  =  8.12622647684
period_log10FAP  =  -3.22280976715
period_uncertainty  =  3.20426568613e-06
phase_cusum  =  0.24151115009
phase_eta  =  0.39284712974
phi21  =  1.19110240123
phi31  =  2.92073850751
quartile31  =  0.32
r21  =  0.119758961225
r31  =  0.176927316044
shapiro_w  =  0.963881671429
skewness  =  -0.121590773042
slope_per10  =  -0.152750010602
slope_per90  =  0.098166661337
stetson_k  =  0.787480157543
weighted_mean  =  14.71
weighted_std  =  0.232029601235
