-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.63


######### Lightcurve features #########

amplitude  =  0.367657193095
cusum  =  0.257689109163
eta  =  0.261492625591
hl_amp_ratio  =  0.622563059542
kurtosis  =  0.236338032224
n_points  =  429
period  =  1.00001936129
period_SNR  =  25.8714978416
period_log10FAP  =  -22.3120374611
period_uncertainty  =  0.000217253836299
phase_cusum  =  0.188604006129
phase_eta  =  0.957038043858
phi21  =  2.26326146161
phi31  =  3.53491354242
quartile31  =  0.43
r21  =  0.134552222046
r31  =  0.161074029853
shapiro_w  =  0.944322049618
skewness  =  -0.651125119261
slope_per10  =  -0.0612705224275
slope_per90  =  0.0565341287112
stetson_k  =  0.752050839642
weighted_mean  =  11.7327738928
weighted_std  =  0.34745628783
