-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.92


######### Lightcurve features #########

amplitude  =  0.262198925634
cusum  =  0.112990003126
eta  =  0.640985967644
hl_amp_ratio  =  0.369869143551
kurtosis  =  -1.07613315744
n_points  =  273
period  =  0.620153834183
period_SNR  =  31.7378413858
period_log10FAP  =  -32.5443181153
period_uncertainty  =  0.000104003798706
phase_cusum  =  0.262094281859
phase_eta  =  0.233084298017
phi21  =  4.09086068377
phi31  =  5.36835690272
quartile31  =  0.44
r21  =  0.473985393666
r31  =  0.327830699165
shapiro_w  =  0.891049742699
skewness  =  -0.572334800266
slope_per10  =  -0.156150849148
slope_per90  =  0.371500011534
stetson_k  =  0.771506720897
weighted_mean  =  14.9325463531
weighted_std  =  0.257823062731
